
Program ies2tab converts IES photometric data to a table to standard output,
 or to a line with summary data (including the cutoff category).

 Its parameters are:
-a#: Albedo of the ground (default 0.10)
-c : write heading of Columns
-f : assume the data giving the Full space angle of outcoming light
-h : Help
-i#: Indicatrix type (default 0, P.Cinzano (2000), 4..6 CIE types also possible)
-ic: Include Comment lines in the otput table
-l : one Line output only
-r : output angles in Radians (to ease polar plots by gnuplot)
-s[#:[<name>]] : write filenames of <= cutoff categories to <name>
    default limit is 1 (0=FCO, 1=FS, 2=CIE-CO, 4=IES-CO, 5=CIE-SCO...),
    default name is sc.lis
-u[#:#:#:#] : compute illumination of a rectangle of
    xmin:xmax:ymin:ymax luminaire heights, zero being below the luminaire
    x axis going to 0 degrees and y to 90 degrees
    (default -0.50:1.50:-3.00:3.00 pole heights);
-z#: extinction of light in Zenith / 1 mag (default 0.30)

( (C) Jan Hollan, N.Copernicus Observatory and Planetarium in Brno, 2001;
 subject to the GNU General Public License, http://www.gnu.org/copyleft;
 source code available at http://astro.sci.muni.cz/pub/hollan/programmes)
